t (ms)

0 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 Processing times for hltL3MuonsHLT_timing_ppMuX_Base hltL3Muons Entries 3053 Mean 370.2 RMS 194.8 Underflow 0 Overflow 224

Processing times for hltL3MuonsHLT_timing_ppMuX_Base