D^0-D^0 Mixing Predictions

Mixing Rate (1/2 ΒAmplitudeΒ^2)

Reference Index

Mixing Amplitude (ΒxΒ,ΒyΒ, etc.)

10^{-10}

10^{-8}

10^{-6}

10^{-4}

10^{-2}

1

0 20 40 60

10^{-19}

10^{-16}

10^{-13}

10^{-10}

10^{-7}

10^{-4}

10^{-1}