Double Gaussian Fit

D* Momentum (GeV) σ̄_{δM} (KeV)

No Wires

CLEO II/SVX

CLEO II (recmprs)

Measured/SVX

q^2 in B^05D*^–l^+ν (GeV^2) Ryd - 850 KeV 260 140 90

0 5 0

750_0 10