T. Hill CLEO 1

SVX Performance

Tracking Efficiency • 2 hit/view = 95% rϕ Impact Parameter Resolution

• σ = 24 ⊕^{42}_{p·sin3/2θ} μm

z Impact Parameter Resolution

• σ = 54 ⊕^{48}_p μm (θ ∼ 90^∘) • σ = 66 ⊕^{84}_p μm (θ ∼ 30^∘)

Moriond EW 98