Propane (C_3H_8)

E_γ, Photon Energy (eV) σ_γ, Photoabsorption Cross Section (Mbarn)

Atomic Additivity 68Ψ of Osc. Strength

Direct Measurement 62Ψ of Osc. Strength

10^{-6}

10^{-4}

10^{-2}

1

10^2

10 10^2 10^3 10^4