D*^+ 5 D^0π^+, D^0 5 π^+π^-

π^+π^- Mass (GeV/c^2)

Entries per 1 MeV/c^2

σ= 6.5 MeV

∼340 Signal

(∼0.10 pb)

CLEO II/SVX

No PID

0

10

20

30

1.825 1.85 1.875 1.9