Peak InvOn^{pedestal_0}_{Entries 0Mean 256.9}

RMS 147.5

100 200 300 400 500 100 120 140 160 180 200 220 240 260 280 300 pedestal_0 Entries 0 Mean 256.9

Peak InvOff

pedestal

Dec InvOn^{pedestal_0}_{Entries 0Mean 256.9}

RMS 147.5

100 200 300 400 500 100 120 140 160 180 200 220 240 260 280 300 pedestal_0 Entries 0 Mean 256.9

Dec InvOff

pedestal

1020-nov19; Record0; 2003-11-19 18:01:51