{
    "ltx_root": {
        "version": 4,
        "minor": 0,
        "ltx_data": [
            {
                "name": "EDA_PROBESET",
                "active": true,
                "debug_cores": [
                    {
                        "type": "XSDB_V3",
                        "name": "dbg_hub",
                        "spec": "labtools_xsdbm_v3",
                        "clk_input_freq_hz": "80000000"
                    },
                    {
                        "type": "XSDBS_V2",
                        "name": "u_ibert_gth_core",
                        "spec": "labtools_xsdbslavelib_v2",
                        "ipName": "ibert_ultrascale_gth",
                        "core_location": {
                            "user_chain": 1,
                            "slave_index": 0,
                            "bscan_switch_index": 0
                        },
                        "uuid": "2CF3EB456B0554069C5E3F6A66C230B3"
                    },
                    {
                        "type": "VIO_V2",
                        "name": "vio_i",
                        "spec": "labtools_vio_v3",
                        "ipName": "vio",
                        "core_location": {
                            "user_chain": 1,
                            "slave_index": 20,
                            "bscan_switch_index": 0
                        },
                        "uuid": "8FCF4077A0CD5C90ACB3ACCA0284B370",
                        "pins": [
                            {
                                "name": "probe_in0",
                                "id": 0,
                                "type": "DATA",
                                "direction": "IN",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 0,
                                "nets": [
                                    {
                                        "name": "probe_in0",
                                        "isBus": false
                                    }
                                ]
                            },
                            {
                                "name": "probe_out0",
                                "id": 1,
                                "type": "DATA",
                                "direction": "OUT",
                                "isVector": false,
                                "leftIndex": 0,
                                "rightIndex": 0,
                                "portIndex": 0,
                                "nets": [
                                    {
                                        "name": "DAQ_SPY_SEL_OBUF",
                                        "isBus": false
                                    }
                                ]
                            }
                        ]
                    }
                ]
            }
        ]
    }
}