DR000148 Chart 1

Prepared by HEP 11/4/97 Page 1

DFA02B8 Run 148

0.00E+00

1.00E+01

2.00E+01

3.00E+01

4.00E+01

5.00E+01

6.00E+01

0 1 2 3 4 5 6 7 Time (days) T0=10/17/97 at 4.31 PM

V o lt s, D eg C ,% R H

0.00E+00

5.00E-01

1.00E+00

1.50E+00

2.00E+00

2.50E+00

3.00E+00

3.50E+00

4.00E+00

4.50E+00

5.00E+00

u A d c voltage temperature humidity guard current bulk current